\begin{center} \begin{huge}\textbf{PIC-{}GCC-{}Library} \end{huge}

\begin{LARGE}\textbf{Bibliothèque standard et de composants}\end{LARGE}\end{center}
\vspace{2cm}
\begin{center}
 \begin{LARGE}         Ing. Fernando Pujaico Rivera \footnote{courriel : fernando.pujaico.rivera en gmail.com} \\
                Développeur Principal \\
                     Chercheur \\
           Universidad Nacional de Ingenieria\\
      Ing. Pedro Jose Ramirez Gutierrez \\
               Prof. Pierre Launay \\
        Santiago González Rodríguez\end{LARGE}
\end{center}

%\begin{large}par Ing. Fernando Pujaico Rivera, Ing. Pedro Jose Ramirez Gutierrez, Prof. Pierre Launay, y Santiago González Rodríguez \end{large}

\vspace{2cm}

\begin{large}traduction en français Pierre Launay per.launay chez free.fr \end{large}
\vspace{1cm}

\begin{large}PIC-{}GCC-{}Library est un ensemble de bibliothèques pour le compilateur PIC GCC.\end{large}
\vspace{1cm}

\begin{large}PIC GCC est un compilateur de C pour microcontrôleurs PIC de la famille 16F de Microchip \end{large}


